From 6e34f5f7fc8598e564adf9b3e08e6cb4275923b5 Mon Sep 17 00:00:00 2001
From: Lex Neva <github.com@lexneva.name>
Date: Thu, 20 Aug 2020 22:11:23 -0400
Subject: v-dialog looks nicer

---
 electron/src/renderer/App.vue | 9 +--------
 1 file changed, 1 insertion(+), 8 deletions(-)

(limited to 'electron/src/renderer/App.vue')

diff --git a/electron/src/renderer/App.vue b/electron/src/renderer/App.vue
index 7579d04e..7495dd05 100644
--- a/electron/src/renderer/App.vue
+++ b/electron/src/renderer/App.vue
@@ -2,14 +2,7 @@
   <div id="app">
     <v-app>
       <v-main>
-        <!-- the v-container, v-row, and v-col give us vertical centering -->
-        <v-container fill-height fluid>
-          <v-row align="center" justify="center">
-            <v-col>
-              <router-view></router-view>
-            </v-col>
-          </v-row>
-        </v-container>
+        <router-view></router-view>
       </v-main>
     </v-app>
   </div>
-- 
cgit v1.2.3

